180 170 160 150 140 130 120 110 100 90 -10 -5 0 5 10 15 20 25 30 Konus-SPI-ACS annulus

3

+3^osyst (=10.23^o)

2

+3^osyst (=7.82^o)

Fermi/GBM ground position

, deg

, deg

WAM-SPI-ACS annulus

1

+3^osyst (=5.41^o)

GRB 081216

Konus-WAM annulus