0 5 10 50

100

150

200

KONUS-WIND GRB 250118 T_0 = 13107.725 s UT (03:38:27.725) S1 21-1360 keV counts / 0.064 s

T-T_0 (s)

0 50 100 150

360-1360 keV 0 20 40 83-360 keV counts / 0.064 s

0 5 10 0 10 20 30

T-T_0 (s)

21-83 keV