-0.2 -0.1 0.0 0.1 0.2 0.3 0 50 100 150 200 250 300 350 400 450 21-1360 keV counts / 0.002 s

T - T_0, s

0 100 200 300

360-1360 keV 0 20 40 60 83-360 keV counts / 0.002 s

-0.2 -0.1 0.0 0.1 0.2 0.3 0

10

20

KONUS-WIND SGR burst 090221 T_0 = 55653.101 s UT (15:27:33.101) S1

T-T_0, sec

21-83 keV